0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 2nd order centered

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 3rd order upwind

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 4th order centered

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 Lax-Wendroff

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 3-DST

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 4-DST

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 Superbee flux limiter

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 3-DST Sweby μ=μ(c)

0.2 0.4 0.6 0.8 0.2 0.4 0.6 0.8 Superbee (no multi-dim)