--- manual/s_ecco/text/optim.tex	2004/10/16 03:40:19	1.5
+++ manual/s_ecco/text/optim.tex	2005/08/01 22:31:36	1.6
@@ -4,6 +4,8 @@
 <!-- CMIREDIR:lsearch_optim: -->
 \end{rawhtml}
 
+Author: Patrick Heimbach
+
 \subsection{General features}
 
 The line search algorithm is based on a quasi-Newton
