--- manual/s_ecco/text/optim.tex	2004/10/16 03:40:19	1.5
+++ manual/s_ecco/text/optim.tex	2010/08/27 13:10:47	1.7
@@ -4,6 +4,8 @@
 <!-- CMIREDIR:lsearch_optim: -->
 \end{rawhtml}
 
+Author: Patrick Heimbach
+
 \subsection{General features}
 
 The line search algorithm is based on a quasi-Newton
@@ -224,7 +226,7 @@
 \newpage
 
 \begin{figure}
-%\input{part8/lsopt_flow_1}
+%\input{s_ecco/text/lsopt_flow_1}
 {\scriptsize
 \begin{verbatim}
   lsopt_top
@@ -285,7 +287,7 @@
 \end{figure}
 
 \begin{figure}
-%\input{part8/lsopt_flow_2}
+%\input{s_ecco/text/lsopt_flow_2}
 {\scriptsize
 \begin{verbatim}
      ...    ...
@@ -348,7 +350,7 @@
 \end{figure}
 
 \begin{figure}
-%\input{part8/lsopt_flow_3}
+%\input{s_ecco/text/lsopt_flow_3}
 {\scriptsize
 \begin{verbatim}
      ...    ...
