--- manual/s_ecco/text/optim.tex	2001/11/12 17:46:01	1.3
+++ manual/s_ecco/text/optim.tex	2010/08/27 13:10:47	1.7
@@ -1,11 +1,16 @@
 \section{The line search optimisation algorithm
 \label{sectionoptim}}
+\begin{rawhtml}
+<!-- CMIREDIR:lsearch_optim: -->
+\end{rawhtml}
+
+Author: Patrick Heimbach
 
 \subsection{General features}
 
 The line search algorithm is based on a quasi-Newton
 variable storage method which was implemented by
-\cite{gil-mar:89}.
+\cite{gil-lem:89}.
 
 TO BE CONTINUED...
 
@@ -221,7 +226,7 @@
 \newpage
 
 \begin{figure}
-%\input{part8/lsopt_flow_1}
+%\input{s_ecco/text/lsopt_flow_1}
 {\scriptsize
 \begin{verbatim}
   lsopt_top
@@ -282,7 +287,7 @@
 \end{figure}
 
 \begin{figure}
-%\input{part8/lsopt_flow_2}
+%\input{s_ecco/text/lsopt_flow_2}
 {\scriptsize
 \begin{verbatim}
      ...    ...
@@ -345,7 +350,7 @@
 \end{figure}
 
 \begin{figure}
-%\input{part8/lsopt_flow_3}
+%\input{s_ecco/text/lsopt_flow_3}
 {\scriptsize
 \begin{verbatim}
      ...    ...
