0 0.2 0.4

-5000

-4500

-4000

-3500

-3000

-2500

-2000

-1500

-1000

-500

0 a)

Temperature error σ^T (in K)

b) Heat flux errorσ^Q (in W.m^{-2} )

0 100 200 300 -80 -60 -40 -20 0 20 40 60 80

20 30 40 50 60 70 80 90