--- manual/s_examples/rotating_tank/tank.tex	2005/06/14 20:09:04	1.12
+++ manual/s_examples/rotating_tank/tank.tex	2005/06/15 14:54:58	1.13
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.12 2005/06/14 20:09:04 afe Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.13 2005/06/15 14:54:58 afe Exp $
 % $Name:  $
 
 \bodytext{bgcolor="#FFFFFFFF"}
@@ -210,14 +210,14 @@
 ($x,y,z$) map and is enumerated and formatted in the same manner as the 
 bathymetry file. 
 
-\item Lines 66 and 57
+\item Lines 66 and 67
 \begin{verbatim}
  tCylIn  = 0
  tCylOut  = 20
 \end{verbatim}
 These line specify the temperatures in degrees Celsius of the interior
 and exterior walls of the tank -- typically taken to be icewater on
-the inside and room temperature on the inside.
+the inside and room temperature on the outside.
 
 
 \end{itemize}
