--- manual/s_examples/rotating_tank/tank.tex	2005/06/15 14:54:58	1.13
+++ manual/s_examples/rotating_tank/tank.tex	2006/04/08 01:50:50	1.14
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.13 2005/06/15 14:54:58 afe Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_examples/rotating_tank/tank.tex,v 1.14 2006/04/08 01:50:50 edhill Exp $
 % $Name:  $
 
 \bodytext{bgcolor="#FFFFFFFF"}
@@ -31,7 +31,7 @@
 This example configuration demonstrates using the MITgcm to simulate a
 laboratory demonstration using a differentially heated rotating
 annulus of water.  The simulation is configured for a laboratory scale
-on a $3^{\circ}$ $\times$ 1cm cyclindrical grid with twenty-nine
+on a $3^{\circ}\times1\mathrm{cm}$ cyclindrical grid with twenty-nine
 vertical levels of 0.5cm each.  This is a typical laboratory setup for
 illustration principles of GFD, as well as for a laboratory data
 assimilation project.
