180W 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180E 90S

60S

30S

0

30N

60N

90N Heat Flux (Min = -7.7 10^{-4} Sv W^{-1} m^2; Max = 42.9 10^{-4} Sv W^{-1} m^2)

-10 -5 0 5 10 15 20 25 30 35 40 45 50

10^{-4} Sv W^{-1} m^2

Sensitivity of the Meridional Overturning - Ocean