180W 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180E 90S

60S

30S

0

30N

60N

90N Currents at 25M, t=1000 years

0.5 m/s

OCEAN

180W 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180E 90S

60S

30S

0

30N

60N

90N Zonal Velocity at 250mb (January)

-10 -5 0 5 10 15 20 25 30 35 40 45 50 m/s

20-Oct-1998

ATMOSPHERE