26.8 26.2

25.5

26.5

27

26.8 26.2 26

25.5

25.5

25.8

25 26 26.5

26.2

26.8

26.5

MITgcm air-sea O_2 flux (mol/m2/yr) with contoured potential density

150 oW

120 oW

90oW

60oW

30oW

0^o

30oE

60oE

90oE

120 oE

150 oE

180^oW

70oS 60oS 50oS 40oS

-15 -10 -5 0 5 10 15