--- manual/s_phys_pkgs/diagnostics.tex	2004/01/28 21:00:10	1.1
+++ manual/s_phys_pkgs/diagnostics.tex	2004/10/12 18:16:03	1.2
@@ -1,4 +1,8 @@
-\section{Diagnostics-Flexible model infrastructure for diagnostic (instananeous or time averaged) output}
+\section{Diagnostics--A Flexible Infrastructure}
+\label{sec:pkg:diagnostics}
+\begin{rawhtml}
+<!-- CMIREDIR:package_diagnostics: -->
+\end{rawhtml}
 
 \subsection{Introduction}
 
