--- manual/s_phys_pkgs/text/fizhi.tex	2005/08/03 17:55:20	1.13
+++ manual/s_phys_pkgs/text/fizhi.tex	2006/04/05 03:35:15	1.14
@@ -842,7 +842,7 @@
 \subsubsection{Fizhi Diagnostics}
 
 Fizhi Diagnostic Menu:
-\label{sec:fizhi-diagnostics:menu}
+\label{sec:pkg:fizhi:diagnostics}
 
 \begin{tabular}{llll}
 \hline\hline
@@ -1374,7 +1374,7 @@
 
 In this section we list and describe the diagnostic quantities available within the 
 GCM.  The diagnostics are listed in the order that they appear in the 
-Diagnostic Menu, Section \ref{sec:fizhi-diagnostics:menu}.
+Diagnostic Menu, Section \ref{sec:pkg:fizhi:diagnostics}.
 In all cases, each diagnostic as currently archived on the output datasets
 is time-averaged over its diagnostic output frequency:
 
