--- manual/s_phys_pkgs/text/gchem.tex	2006/04/05 03:35:15	1.5
+++ manual/s_phys_pkgs/text/gchem.tex	2006/04/06 17:36:07	1.6
@@ -122,7 +122,7 @@
 air-sea fluxes, and sea surface pH (among others) are written
 out by {\it dic\_biotic\_diags.F} which is called from {\it gchem\_diags.F}.
 
-\subsubsection{GCHEM Diagnostics
+\subsubsection{GCHEM Diagnostics}
 \label{sec:pkg:gchem:diagnostics}
 
 \begin{verbatim}
