--- manual/s_phys_pkgs/text/gchem.tex	2006/04/06 17:36:07	1.6
+++ manual/s_phys_pkgs/text/gchem.tex	2006/04/06 21:35:26	1.7
@@ -125,6 +125,7 @@
 \subsubsection{GCHEM Diagnostics}
 \label{sec:pkg:gchem:diagnostics}
 
+{\footnotesize
 \begin{verbatim}
 
 ------------------------------------------------------------------------
@@ -138,6 +139,7 @@
 DICPCO2 |  1 |SM P    M1      |atm             |Partial Pressure of CO2 (atm)
 DICPHAV |  1 |SM P    M1      |dimensionless   |pH (dimensionless)
 \end{verbatim}
+}
 
 \subsubsection{Do's and Don'ts}
 
