--- manual/s_phys_pkgs/text/gmredi.tex	2001/10/25 18:36:56	1.3
+++ manual/s_phys_pkgs/text/gmredi.tex	2001/11/13 14:54:50	1.4
@@ -362,11 +362,14 @@
 
 
 \begin{figure}
+\begin{center}
 %\includegraphics{mixedlayer-cox.eps}
 %\includegraphics{mixedlayer-diff.eps}
+Figure missing.
+\end{center}
 \caption{Mixed layer depth using GM parameterization with a) Cox slope
 clipping and for comparison b) using horizontal constant diffusion.}
-\ref{fig-mixedlayer}
+\label{fig-mixedlayer}
 \end{figure}
 
 
