--- manual/s_phys_pkgs/text/gmredi.tex	2001/10/25 18:36:56	1.3
+++ manual/s_phys_pkgs/text/gmredi.tex	2001/11/13 19:01:42	1.5
@@ -240,7 +240,7 @@
 \begin{center}
 \resizebox{5.0in}{3.0in}{\includegraphics{part6/tapers.eps}}
 \end{center}
-\caption{Taper functions used in GKW91 and DM95.}
+\caption{Taper functions used in GKW99 and DM95.}
 \label{fig:tapers}
 \end{figure}
 
@@ -303,7 +303,7 @@
 
 \subsubsection{Tapering: Gerdes, Koberle and Willebrand, Clim. Dyn. 1991}
 
-The tapering scheme used in Gerdes et al., 1991, (\cite{gkw91})
+The tapering scheme used in Gerdes et al., 1999, (\cite{gkw:99})
 addressed two issues with the clipping method: the introduction of
 large vertical fluxes in addition to convective adjustment fluxes is
 avoided by tapering the GM/Redi slopes back to zero in
@@ -328,7 +328,7 @@
 \subsection{Tapering: Danabasoglu and McWilliams, J. Clim. 1995}
 
 The tapering scheme used by Danabasoglu and McWilliams, 1995,
-\cite{DM95}, followed a similar procedure but used a different
+\cite{dm:95}, followed a similar procedure but used a different
 tapering function, $f_1(S)$:
 \begin{equation}
 f_1(S) = \frac{1}{2} \left( 1+\tanh \left[ \frac{S_c - |S|}{S_d} \right] \right)
@@ -344,7 +344,7 @@
 
 \subsection{Tapering: Large, Danabasoglu and Doney, JPO 1997}
 
-The tapering used in Large et al., 1997, \cite{ldd97}, is based on the
+The tapering used in Large et al., 1997, \cite{ldd:97}, is based on the
 DM95 tapering scheme, but also tapers the scheme with an additional
 function of height, $f_2(z)$, so that the GM/Redi SGS fluxes are
 reduced near the surface:
@@ -362,11 +362,14 @@
 
 
 \begin{figure}
+\begin{center}
 %\includegraphics{mixedlayer-cox.eps}
 %\includegraphics{mixedlayer-diff.eps}
+Figure missing.
+\end{center}
 \caption{Mixed layer depth using GM parameterization with a) Cox slope
 clipping and for comparison b) using horizontal constant diffusion.}
-\ref{fig-mixedlayer}
+\label{fig-mixedlayer}
 \end{figure}
 
 
