--- manual/s_phys_pkgs/text/gridalt.tex	2006/04/05 02:27:33	1.8
+++ manual/s_phys_pkgs/text/gridalt.tex	2006/04/06 21:35:26	1.10
@@ -238,6 +238,19 @@
 
 \noindent And similarly, gridalt contains subroutine phys2dyn.
 
+\subsubsection {Gridalt Diagnostics}
+\label{sec:pkg:gridalt:diagnostics}
+
+{\footnotesize
+\begin{verbatim}
+
+------------------------------------------------------------------------
+<-Name->|Levs|<-parsing code->|<--  Units   -->|<- Tile (max=80c) 
+------------------------------------------------------------------------
+DPPHYS  | 20 |SM      ML      |Pascal          |Pressure Thickness of Layers on Fizhi Grid
+\end{verbatim}
+}
+
 \subsubsection {Dos and donts}
 
 \subsubsection {Gridalt Reference} 
