--- manual/s_phys_pkgs/text/gridalt.tex	2006/04/05 02:27:33	1.8
+++ manual/s_phys_pkgs/text/gridalt.tex	2006/06/28 15:35:07	1.11
@@ -238,6 +238,26 @@
 
 \noindent And similarly, gridalt contains subroutine phys2dyn.
 
+\subsubsection {Gridalt Diagnostics}
+\label{sec:pkg:gridalt:diagnostics}
+
+{\footnotesize
+\begin{verbatim}
+
+------------------------------------------------------------------------
+<-Name->|Levs|<-parsing code->|<--  Units   -->|<- Tile (max=80c) 
+------------------------------------------------------------------------
+DPPHYS  | 20 |SM      ML      |Pascal          |Pressure Thickness of Layers on Fizhi Grid
+\end{verbatim}
+}
+
 \subsubsection {Dos and donts}
 
 \subsubsection {Gridalt Reference} 
+
+\subsubsection{Experiments and tutorials that use gridalt}
+\label{sec:pkg:gridalt:experiments}
+
+\begin{itemize}
+\item{Fizhi experiment, in fizhi-cs-32x32x10 verification directory }
+\end{itemize}
