--- manual/s_phys_pkgs/text/gridalt.tex	2006/04/05 23:42:27	1.9
+++ manual/s_phys_pkgs/text/gridalt.tex	2006/06/28 15:35:07	1.11
@@ -241,6 +241,7 @@
 \subsubsection {Gridalt Diagnostics}
 \label{sec:pkg:gridalt:diagnostics}
 
+{\footnotesize
 \begin{verbatim}
 
 ------------------------------------------------------------------------
@@ -248,8 +249,15 @@
 ------------------------------------------------------------------------
 DPPHYS  | 20 |SM      ML      |Pascal          |Pressure Thickness of Layers on Fizhi Grid
 \end{verbatim}
-
+}
 
 \subsubsection {Dos and donts}
 
 \subsubsection {Gridalt Reference} 
+
+\subsubsection{Experiments and tutorials that use gridalt}
+\label{sec:pkg:gridalt:experiments}
+
+\begin{itemize}
+\item{Fizhi experiment, in fizhi-cs-32x32x10 verification directory }
+\end{itemize}
