--- manual/s_phys_pkgs/text/gridalt.tex	2006/04/05 23:42:27	1.9
+++ manual/s_phys_pkgs/text/gridalt.tex	2006/04/06 21:35:26	1.10
@@ -241,6 +241,7 @@
 \subsubsection {Gridalt Diagnostics}
 \label{sec:pkg:gridalt:diagnostics}
 
+{\footnotesize
 \begin{verbatim}
 
 ------------------------------------------------------------------------
@@ -248,7 +249,7 @@
 ------------------------------------------------------------------------
 DPPHYS  | 20 |SM      ML      |Pascal          |Pressure Thickness of Layers on Fizhi Grid
 \end{verbatim}
-
+}
 
 \subsubsection {Dos and donts}
 
