--- manual/s_phys_pkgs/text/seaice.tex	2009/05/15 07:48:47	1.10
+++ manual/s_phys_pkgs/text/seaice.tex	2010/08/27 13:15:37	1.11
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/seaice.tex,v 1.10 2009/05/15 07:48:47 mlosch Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/seaice.tex,v 1.11 2010/08/27 13:15:37 jmc Exp $
 % $Name:  $
 
 %%EH3  Copied from "MITgcm/pkg/seaice/seaice_description.tex"
@@ -127,7 +127,7 @@
 ~ \\
 %
 Table~\ref{tab:pkg:seaice:runtimeparms} lists most run-time parameters.
-\input{part6/seaice-parms.tex}
+\input{s_phys_pkgs/text/seaice-parms.tex}
 
 \paragraph{Input fields and units\label{sec:pkg:seaice:fields_units}}
 \begin{description}
