--- manual/s_phys_pkgs/text/seaice.tex	2010/08/27 13:15:37	1.11
+++ manual/s_phys_pkgs/text/seaice.tex	2010/08/30 23:09:21	1.12
@@ -1,4 +1,4 @@
-% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/seaice.tex,v 1.11 2010/08/27 13:15:37 jmc Exp $
+% $Header: /home/ubuntu/mnt/e9_copy/manual/s_phys_pkgs/text/seaice.tex,v 1.12 2010/08/30 23:09:21 jmc Exp $
 % $Name:  $
 
 %%EH3  Copied from "MITgcm/pkg/seaice/seaice_description.tex"
@@ -16,7 +16,7 @@
 
 %----------------------------------------------------------------------
 \subsubsection{Introduction
-\label{sec:pkg:exf:intro}}
+\label{sec:pkg:seaice:intro}}
 
 
 Package ``seaice'' provides a dynamic and thermodynamic interactive
@@ -58,14 +58,14 @@
 no additional CPP options are required.
 %
 \end{itemize}
-(see Section \ref{sect:buildingCode}).
+(see Section \ref{sec:buildingCode}).
 
 Parts of the SEAICE code can be enabled or disabled at compile time
 via CPP preprocessor flags. These options are set in either
 \code{SEAICE\_OPTIONS.h} or in \code{ECCO\_CPPOPTIONS.h}.
 Table \ref{tab:pkg:seaice:cpp} summarizes these options.
 
-\begin{table}[h!]
+\begin{table}[!ht]
 \centering
   \label{tab:pkg:seaice:cpp}
   {\footnotesize
@@ -769,7 +769,7 @@
 Available output fields are summarized in 
 Table \ref{tab:pkg:seaice:diagnostics}.
 
-\begin{table}[h!]
+\begin{table}[!ht]
 \centering
 \label{tab:pkg:seaice:diagnostics}
 {\footnotesize
