--- manual/s_phys_pkgs/text/thsice.tex	2006/04/05 23:42:27	1.6
+++ manual/s_phys_pkgs/text/thsice.tex	2006/04/06 21:35:26	1.7
@@ -481,6 +481,7 @@
 \subsubsection{THSICE Diagnostics}
 \label{sec:pkg:thsice:diagnostics}
 
+{\footnotesize
 \begin{verbatim}
 
 ------------------------------------------------------------------------
@@ -505,6 +506,7 @@
 SItOcMxL|  1 |SM      M1      |degC            |ocean mixed layer temperature
 SIsOcMxL|  1 |SM P    M1      |psu             |ocean mixed layer salinity
 \end{verbatim}
+}
 
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 \vspace{1cm}
