0 0.5 1

-0.2 0 0.2 0.4 0.6 0.8 1 1.2

0

3

6

9 α,β= 0.60,0.000 ; f^c= 0.5025

0 0.5 1 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

0

3

6

9

α,β= 0.50,0.250 ; f^c= 0.7698

0 0.5 1 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

0

3 6 9

α,β= 0.50,0.417 ; f^c= 0.7236(0.6760)

0 0.5 1 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

0

3

6 9

α,β= 0.50,0.281 ; f^c= 0.7861(0.7686)

Oscil. response of AB-3 : CFL (f*dt)= 0.0 -> 0.9 every 0.1